From 80f8f8f4eb7991937269c7329b185ee8a2fe885a Mon Sep 17 00:00:00 2001
From: Alyssa Ross <hi@alyssa.is>
Date: Sat, 8 Apr 2023 18:46:24 +0000
Subject: lib/config.default.nix: pin Nixpkgs

This makes the common case of building Spectrum, using the default
Nixpkgs, much easier.  It's easy to make mistakes setting up NIX_PATH,
so we should leave custom Nixpkgs to the config file or nix command
line.

This doesn't preclude using Flakes to pin Nixpkgs in future, if we end
up going that route.

Signed-off-by: Alyssa Ross <hi@alyssa.is>
---
 Documentation/contributing/building-documentation.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Documentation/contributing/building-documentation.adoc')

diff --git a/Documentation/contributing/building-documentation.adoc b/Documentation/contributing/building-documentation.adoc
index 1beffa8..fd3c903 100644
--- a/Documentation/contributing/building-documentation.adoc
+++ b/Documentation/contributing/building-documentation.adoc
@@ -26,7 +26,7 @@ cd spectrum/Documentation
 +
 [source,shell]
 ----
-nix-shell -I nixpkgs=https://spectrum-os.org/git/nixpkgs/snapshot/nixpkgs-rootfs.tar.gz
+nix-shell
 ----
 . In the development shell, do an initial build of the documentation
 site:
-- 
cgit 1.4.1

